<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.3.0">
<drawing>
<board>
<plain>
<wire x1="17.78" y1="21.59" x2="68.25" y2="21.59" width="0.000253125" layer="20"/>
<wire x1="68.25" y1="21.59" x2="68.25" y2="69.85" width="0.000253125" layer="20"/>
<wire x1="17.78" y1="69.85" x2="17.78" y2="21.59" width="0.000253125" layer="20"/>
<wire x1="17.78" y1="69.85" x2="68.25" y2="69.85" width="0.000253125" layer="20"/>
</plain>
<libraries>
<library name="fab">
<packages>
<package name="SOIC14">
<description>&lt;b&gt;Small Outline Package&lt;/b&gt;</description>
</package>
<package name="R1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;</description>
</package>
<package name="2X03SMD">
</package>
<package name="C1206">
<description>&lt;b&gt;CAPACITOR&lt;/b&gt;</description>
</package>
<package name="EFOBM">
</package>
<package name="1X06SMD">
</package>
</packages>
</library>
<library name="tr-j">
<packages>
<package name="SC-59">
<description>&lt;b&gt;CHIP&lt;/b&gt;&lt;p&gt;
SC-59&lt;p&gt;
L×W : 2.9mm×1.5mm&lt;p&gt;
(TO-236mod/SC-59)</description>
</package>
</packages>
</library>
<library name="piher">
<description>&lt;b&gt;Piher Potentiometers&lt;/b&gt;&lt;p&gt;
PC-16/16 mm carbon types&lt;p&gt;
&lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
<package name="1X06SMD">
</package>
</packages>
</library>
<library name="pinhead+final project">
<packages>
<package name="1X02_SMT">
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="IC1" library="fab" package="SOIC14" value="ATTINY44-SSU">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="MOSFET1" library="tr-j" package="SC-59" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R1" library="fab" package="R1206" value="10k">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R2" library="fab" package="R1206" value="200">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R3" library="fab" package="R1206" value="200">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="U$1" library="fab" package="2X03SMD" value="AVRISPSMD">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="C1" library="fab" package="C1206" value="1uF">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R4" library="fab" package="R1206" value="10k">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="U$4" library="fab" package="EFOBM" value="RESONATOR 20MHz"/>
<element name="U$5" library="fab" package="1X06SMD" value="FTDI-SMD-HEADER">
<attribute name="NAME"/>
</element>
<element name="R5" library="piher" package="1X06SMD" value="PC16SPOTENTIOMETERSMD">
<attribute name="NAME"/>
</element>
<element name="R6" library="fab" package="R1206" value="0">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="JP1" library="pinhead+final project" package="1X02_SMT" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="JP2" library="pinhead+final project" package="1X02_SMT" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="JP3" library="pinhead+final project" package="1X02_SMT" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="JP4" library="pinhead+final project" package="1X02_SMT" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
</elements>
<signals>
<signal name="VCC">
<contactref element="IC1" pad="1"/>
<contactref element="U$1" pad="2"/>
<contactref element="C1" pad="1"/>
<contactref element="R4" pad="1"/>
<contactref element="U$5" pad="3"/>
<contactref element="R6" pad="2"/>
<contactref element="R6" pad="1"/>
<contactref element="JP1" pad="1"/>
<contactref element="JP2" pad="1"/>
<contactref element="R5" pad="3"/>
</signal>
<signal name="GND">
<contactref element="IC1" pad="14"/>
<contactref element="U$1" pad="6"/>
<contactref element="C1" pad="2"/>
<contactref element="U$4" pad="2"/>
<contactref element="MOSFET1" pad="2"/>
<contactref element="R1" pad="1"/>
<contactref element="U$5" pad="1"/>
<contactref element="R5" pad="1"/>
<contactref element="JP2" pad="2"/>
<contactref element="JP3" pad="2"/>
<contactref element="JP4" pad="2"/>
</signal>
<signal name="LED">
<contactref element="R2" pad="1"/>
<contactref element="IC1" pad="6"/>
</signal>
<signal name="LED2">
<contactref element="R3" pad="1"/>
<contactref element="IC1" pad="5"/>
</signal>
<signal name="N$3">
<contactref element="R2" pad="2"/>
<contactref element="JP3" pad="1"/>
</signal>
<signal name="N$4">
<contactref element="R3" pad="2"/>
<contactref element="JP4" pad="1"/>
</signal>
<signal name="TX">
<contactref element="IC1" pad="13"/>
<contactref element="U$5" pad="4"/>
</signal>
<signal name="RX">
<contactref element="IC1" pad="12"/>
<contactref element="U$5" pad="5"/>
</signal>
<signal name="G">
<contactref element="MOSFET1" pad="1"/>
<contactref element="R1" pad="2"/>
<contactref element="IC1" pad="10"/>
</signal>
<signal name="SCK">
<contactref element="IC1" pad="9"/>
<contactref element="U$1" pad="3"/>
</signal>
<signal name="MISO">
<contactref element="IC1" pad="8"/>
<contactref element="U$1" pad="1"/>
</signal>
<signal name="MOSI">
<contactref element="IC1" pad="7"/>
<contactref element="U$1" pad="4"/>
</signal>
<signal name="RST">
<contactref element="IC1" pad="4"/>
<contactref element="U$1" pad="5"/>
<contactref element="R4" pad="2"/>
</signal>
<signal name="D">
<contactref element="MOSFET1" pad="3"/>
<contactref element="JP1" pad="2"/>
</signal>
<signal name="N$1">
<contactref element="IC1" pad="3"/>
<contactref element="U$4" pad="3"/>
</signal>
<signal name="N$2">
<contactref element="IC1" pad="2"/>
<contactref element="U$4" pad="1"/>
</signal>
<signal name="POT">
<contactref element="IC1" pad="11"/>
<contactref element="R5" pad="2"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
